\begin{tikzpicture}
    \begin{axis}[
        width  = 0.85*\textwidth,
        height = 8cm,
        major x tick style = transparent,
        ymajorgrids = true,
        ylabel = {Current [\unit{\milli\ampere}]},
        width=1.0\linewidth,
        height=5.0cm,
        symbolic x coords={
            IDD2N, 
            IDD5AB,
            IDD6,
            IDD4R,
            IDD4W*,
            IDD0*, 
        },
        xtick = data,
        xticklabel style={rotate=90},
        scaled y ticks = false,
        enlarge x limits=0.1,
        ybar=1*\pgflinewidth,
        bar width=3pt,
        ymin=0,
        ymax=800,
        legend pos=north west,
        legend style={font=\footnotesize, draw=none, fill=none},
    ]
        \addplot[style={green,fill=green,mark=none}] coordinates {
            (IDD2N,    25.84722222)
            %(IDD5AB*,  62.92222222)
            (IDD5AB,  27.5)
            (IDD6,     13.96925926)
            (IDD4R,    291.5555556)
            (IDD4W*,   125.7518519)
            (IDD0*,    35.08666667)
        };
        \addplot[style={yellow,fill=yellow,mark=none}] coordinates {
            (IDD2N,    25.57925926)
            %(IDD5AB*,  63.53333333)
            (IDD5AB,  27.3)
            (IDD6,     16.23518519)
            (IDD4R,    300.5177778)
            (IDD4W*,   125.7725926)
            (IDD0*,    35.70814815)
        };
        \addplot[style={orange,fill=orange,mark=none}] coordinates {
            (IDD2N,    26.81666667)
            %(IDD5AB*,  65.04148148)
            (IDD5AB,  28.6)
            (IDD6,     19.28814815)
            (IDD4R,   307.56185190)
            (IDD4W*,  130.68703700)
            (IDD0*,    40.25925926)
        };
        \addplot[style={gray,fill=gray,mark=none}] coordinates {
            (IDD2N,     36.15)
            (IDD5AB,   38.65)
            (IDD6,      21.75)
            (IDD4R,    374.70)
            (IDD4W*,   272.95)
            (IDD0*,     56.45)
        };             

        \legend{
            \qty{30}{\celsius},
            \qty{60}{\celsius},
            \qty{90}{\celsius},
            Datasheet
        }

    \end{axis}
\end{tikzpicture}
